XFree86

Pojmy

Pojmom

/etc/X11/XF86Config-4

Monitor Device InputDevice Modes Screen

ServerLayout

Files Module

DRI Parametre pre DRI modul ServerFlags

Vendor VideoAdaptor Xv Xv

Option

Monitor

Monitor. V sekciiModes

Section "Monitor"
        Identifier      "Generic Monitor"
        HorizSync       30.0 - 97.0
        VertRefresh     50.0 - 150.0
        UseModes        "Modes[0]"
        Option          "DPMS"
EndSection

Monitor Identifier HorizSync

VertRefresh

Section "Modes"
  Identifier "Modes[0]"
  Modeline "712x600"  35.0   712 740 850 900   400 410 412 425
  Modeline "352x288"  25.10  352 368 416 432   288 296 290 310
  Mode "1024x768"
    DotClock 65.004
    HTimings 1024 1048 1184 1344
    VTimings 768 771 777 806
    Flags    "-HSync" "-VSync"
  EndMode
EndSection

Sekcia Modes ModeLine Mode

xvidtune

Section "InputDevice"
        Identifier      "Configured Mouse"
        Driver          "mouse"
        Option          "CorePointer"
        Option          "Device"                "/dev/psaux"
        Option          "Protocol"              "PS/2"
        Option          "Emulate3Buttons"       "true"
EndSection

Section "InputDevice"
        Identifier      "Generic Mouse"
        Driver          "mouse"
        Option          "SendCoreEvents"        "true"

        Option          "Device"                "/dev/input/mice"
        Option          "Protocol"              "ImPS/2"
        Option          "ZAxisMapping"          "4 5"
EndSection

CorePointer

SendCoreEvents true 1, on, yes ServerFlags

Generic Mouse ZAxisMapping X alebo Y

Device Protocol Device Protocol

/dev/input/mice /dev/psaux /dev/misc/psaux
               /dev/ttyS00 alebo /dev/ttyS01 /dev/tts/0, /dev/tts/1

DevFS ImPS/2 Auto PS/2 Auto Microsoft

Section "InputDevice"
        Identifier      "Generic Keyboard"
        Driver          "keyboard"
        Option          "CoreKeyboard"
        Option          "XkbRules"      "xfree86"
        Option          "XkbModel"      "pc104"
        Option          "XkbLayout"     "us"
EndSection

CoreKeyboard XkbModel

XkbRules xfree86

XkbLayout XkbLayout us hodnotu cz cz_qwerty

setxkbmap cz

XkbLayout XkbOptions

XkbVariant

hotkeys alebo lineakd

Section "Device"
        Identifier      "Generic Video Card"
        Driver          "neomagic"
EndSection

BusID

Chipset VideoRam Option

DRI - direct rendering infrastructure

Section "Module"
        Load    "GLcore"
        Load    "dri"
        Load    "glx"
        ...
EndSection
...
Section "DRI"
        Mode    0666
EndSection

GLcore, glx a dri DRI

nVidia nvidia a pomocou

Section "Screen"
        Identifier      "Default Screen"
        Device          "Generic Video Card"
        Monitor         "Generic Monitor"
        DefaultDepth    24
        SubSection "Display"
                Depth           16
                Modes           "1024x768"
        EndSubSection
        SubSection "Display"
                Depth           24
                Modes           "1024x768"
        EndSubSection
EndSection

Screen

Modes Monitor Identifier Monitor

ServerLayout

Section "ServerLayout"
        Identifier      "Default Layout"
        Screen          "Default Screen"
        InputDevice     "Generic Keyboard"
        InputDevice     "Generic Mouse"
        InputDevice     "Configured Mouse"
EndSection

InputDevice

ServerLayout

Section "Device"

EndSection
Section "Device"

EndSection
....
Section "ServerLayout"

EndSection

Option "Xinerama"

Fonty a antialiasing

Font Server

Files FontPath

Section "Files"
    FontPath    "unix/:7110"
    FontPath    "tcp/baby.sub-etha.sk:7110"

EndSection

Qt alebo FreeType2

FreeType2

                  .fonts/

/var/log/XFree86.0.log
                                                .xsession-errors /var/log/XFree86.0.log
                                                            (EE)